-- If you have Augeas available, you may want to use that in conjunction with this more limited check.
SELECT
  file.path,
  uid,
  gid,
  mode,
  file.mtime,
  file.size,
  hash.sha256,
  CONCAT (file.path, ',', mode, ',', size, ',', sha256) AS exception_key
FROM
  file
  LEFT JOIN hash on file.path = hash.path
  LEFT JOIN magic ON file.path = magic.path
WHERE
  (
    file.path IN ('/etc/ld.so.conf', '/etc/ld.so.preload')
    OR file.path LIKE "/etc/ld.so.conf.d/%"
    OR file.path LIKE "/etc/ld.so.conf.d/.%"
  )
  AND file.filename NOT IN ('.', '..')
  AND exception_key NOT IN (
    '/etc/ld.so.conf,0644,117,dad04a370e488aa85fb0a813a5c83cf6fd981ce01883fc59685447b092de84b5',
    '/etc/ld.so.conf,0644,28,239c865e4c0746a01f82b03d38d620853bab2a2ba8e81d6f5606c503e0ea379f',
    '/etc/ld.so.conf,0644,34,d4b198c463418b493208485def26a6f4c57279467b9dfa491b70433cedb602e8',
    '/etc/ld.so.conf.d/cuda.conf,0644,66,a65f7d96e2447eb40b1be9586b90eb0bd776a8938c93d21f9606d2880b548b28',
    '/etc/ld.so.conf.d/dyninst-x86_64.conf,0644,19,a4c740c1f59176d816ba18d429ba823317d3db416accf6d79a9cb0ac845d9d50',
    '/etc/ld.so.conf.d/fakeroot-x86_64-linux-gnu.conf,0644,38,af7edc777dd224bade078ba540538444db69856533c02e18a7f9fbbdd23bd181',
    '/etc/ld.so.conf.d/fakeroot.conf,0644,21,564c4c4d369d005702d825d34edc5e5568cb1ab6ee1b19fa03d0d672fb8b3aee',
    '/etc/ld.so.conf.d/i386-linux-gnu.conf,0644,168,023231b8d6d21a7f4b1a59b875576604395041c814c0fd640d4a1d3d29455e6a',
    '/etc/ld.so.conf.d/lib32-glibc.conf,0644,11,c27424154a6096ae32c0824b785e05de6acef33d9224fd6147d1936be9b4962b',
    '/etc/ld.so.conf.d/libc.conf,0644,44,90d4c7e43e7661cd116010eb9f50ad5817e43162df344bd1ad10898851b15d41',
    '/etc/ld.so.conf.d/libiscsi-x86_64.conf,0644,17,fa3839c3cb893d3a589a020a0a9a010de1332b8385ee8139660e2da8bcc932a3',
    '/etc/ld.so.conf.d/llvm13-x86_64.conf,0644,22,4da62e9ec76b030c527e2ea87ccfab1baeff7d0f9092f980231e49961bb97de0',
    '/etc/ld.so.conf.d/opencollada.conf,0644,21,2fc9656a2b881ca4528416daa91fc525adaa97d73e96a18b41aa7856270eba1f',
    '/etc/ld.so.conf.d/pipewire-jack-x86_64.conf,0644,30,cf4cb69feaa8ec8b99558c4e1123518831b3c56488981cbc34a662fe218ef221',
    '/etc/ld.so.conf.d/tix-x86_64.conf,0644,18,b2ef4843990ded5fd96e417fc08027a785fac59bd70eca6a26dd7b057542273a',
    '/etc/ld.so.conf.d/x86_64-linux-gnu.conf,0644,100,f03e4740e6922b4f4a1181cd696b52f62f9f10d003740a8940f7121795c59c98'
  )
