-- Retrieves the current status of IP/IPv6 forwarding.
--
-- interval: 3600
-- platform: posix
-- value: Identify if a machine is being used as relay.
-- version: 1.4.5

select * from system_controls where oid = '4.30.41.1' union select * from system_controls where oid = '4.2.0.1';
